A

G4VSensitiveDetector activate( ) clear( ) drawAll( ) endOfEvent( ) getName( ) | processHits( )

counter chamber calorimeter

RWTValOrderedVe ctor (from RogueWave) A

G4VHit draw( ) print( )

counterHit chamberHit calorimeterHi t

These derived classes are just examples... Implementations should be done by users accoring to their actual detector setups.

counterHitsCollectio nArray

A

G4VHitsCollection

counterHitsCollection chamberHitsColl ection chamberHitsCollecti onArray calorimeterHi tsCollection calorimeterHitsColle ctionArray aCollection

1 0..n

hit 1

1..n

array 1 1

1 1

1 1

G4Allocator (from Globals)

RWTPtrOrderedVe

ctor (from RogueWave)

Choice out of these two kinds of vectors.