G4Decay

DecayIt( ) GetMeanFreePath( ) GetLifeTime( ) {1}

G4Transportation

GetContinuousStepLimit( ) AlongStepDoIt( )

A

G4VProcess

AlongStepDoIt( ) AlongStepGetPhysicalInteractionLength( ) AtRestDoIt( ) AtRestGetPhysicalInteractionLength( ) PostStepDoIt( ) PostStepGetPhysicalInteractionLength( )

A

G4VDiscreteProcess

GetMeanFreePath( ) PostStepDoIt( )

A

G4VRestProcess

GetMeanLifeTime( ) AtRestDoIt( )

A

G4VContinuousProcess

AlongStepDoIt( ) GetContinuousStepLimit( )

A

G4VRestContinuous Process

AlongStepDoIt( ) GetContinuousStepLimit( ) AtRestDoIt( ) GetMeanLifeTime( )

A

G4VRestDiscreteProcess

AtRestDoIt( ) GetMeanLifeTime( ) GetMeanFreePath( ) PostStepDoIt( )

A

G4VRestContinouousDiscrete Process

AtRestDoIt( ) GetMeanFreePath( ) GetMeanLifeTime( ) PostStepDoIt( ) AlongStepDoIt( ) GetContinuousStepLimit( )

A

G4VContinousDiscrete Process

AlongStepDoIt( ) GetMeanFreePath( ) PostStepDoIt( ) GetContinuousStepLimit( )

G4eplusAnnihilation

AtRestDoIt( ) PostStepDoIt( ) GetMeanLifeTime( ) GetMeanFreePath( )

G4eMultipleScattering

AlongStepDoIt( ) PostStepDoIt( ) GetContinuousStepLimit( ) TrueGeomTransformation( ) GetMeanFreePath( )

A

G4hEnergyLoss

AlongStepDoIt( ) PostStepDoIt( ) GetContinuousStepLimit( ) GetMeanFreePath( )

G4hIonisation

PostStepDoIt( ) GetMeanFreePath( )

G4ComptonScattering

PostDoIt( ) GetMeanFreePath( )