(GeV) νE 0 0.2 0.4 0.6 0.8 1 1.2 1.4 u.a.

0

5

10

15

20

25

30

11 x10

Multi decay Probability

(a)

+π from μν

(GeV) νE 0 0.2 0.4 0.6 0.8 1 1.2 1.4 u.a.

0

5

10

15

20

25

30

35

40

45 10 x10 (b) -π from μν