P (GeV/c)

0 0.5 1 1.5 2 2.5 3

/sπ

0

20

40

60

80

100

12 x10

2.2 GeV 3.5 GeV 4.5 GeV 6.5 GeV

momentum +π (a)

(degree) θ 0 20 40 60 80 100 120 140 160 180

/sπ

0 2 4 6 8 10 12 14 16 18 20 22 12 x10 angle +π (b)