E (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

/20MeV/year 2 /100m ν

0 10 20 30 40 50 60 10 x10

0 0.5 1 1.5 2 0 5 10 15 20 25 9 x10 flux μν

E (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

/20MeV/year 2 /100m ν

0 10 20 30 40 50 11 x10

0 0.5 1 1.5 2 0 2 4 6 8 10 12 14 16 18 10 x10 flux μν

E (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

/20MeV/year 2 /100m ν

0 10 20 30 40 50 60 8 x10 flux^eν

E (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

/20MeV/year 2 /100m ν

0 20 40 60 80 100 8 x10 flux^eν