(deg) CPδ -100 0 100

)_{13}θ(2^2sin

-410

-310

-210

-110

NF Opt.

SB Opt. (rate only) SB Opt. (spectrum) = 0 tr 13θ=^{tr}_{CP}δ

90% CL