(GeV) νE 0.2 0.4 0.6 0.8 1

/20MeV/yr 2 Flux/m

0

0.02

0.04

0.06

0.08

1210× μν μν×10 eν× 100 eν× 1000

+ focusing

(GeV) νE 0.2 0.4 0.6 0.8 1

/20MeV/yr 2 Flux/m

0

0.02

0.04

0.06

1210× μν μν×10 eν× 100 eν× 1000

- focusing