 01.2

1.22.52.53.73.75

0

  9.0
                                                                                                             9.0   9.0

 -9.0

                                                                                                            -9.0  -9.0

 18.0

                                                                                                            18.0  18.0

-18.0

                                                                                                           -18.0 -18.0

 27.0

                                                                                                            27.0  27.0

-27.0

                                                                                                           -27.0 -27.0

 36.0
                                                                                                            36.0  36.0

-36.0

                                                                                                           -36.0 -36.0

 45.0

                                                                                                            45.0  45.0

-45.0

                                                                                                           -45.0 -45.0

 54.0

                                                                                                            54.0  54.0

-54.0

                                                                                                           -54.0 -54.0

 63.0

                                                                                                            63.0  63.0

-63.0

                                                                                                           -63.0 -63.0

 72.0

                                                                                                            72.0  72.0

-72.0

                                                                                                           -72.0 -72.0

 81.0

                                                                                                            81.0  81.0

                                                                                                           -81.0 -81.0

                           20.0 340.0

20.0 340.0

                           20.0 340.0

                                                                 40.0 320.0

                                         40.0 320.0

                                                                 40.0 320.0

                                                                                                       60.0 300.0

                                                                                  60.0 300.0

                                                                                                       60.0 300.0

80.0 280.0

80.0 280.0

80.0 280.0

100.0 260.0

100.0 260.0

100.0 260.0

120.0 240.0

120.0 240.0

120.0 240.0

140.0 220.0

140.0 220.0

140.0 220.0

160.0 200.0

160.0 200.0

160.0 200.0

 01.2

1.22.52.53.73.75

0

  9.0

                                                                                                             9.0   9.0

 -9.0

                                                                                                            -9.0  -9.0

 18.0

                                                                                                            18.0  18.0

-18.0

                                                                                                           -18.0 -18.0

 27.0

                                                                                                            27.0  27.0

-27.0

                                                                                                           -27.0 -27.0

 36.0
                                                                                                            36.0  36.0

-36.0

                                                                                                           -36.0 -36.0

 45.0

                                                                                                            45.0  45.0

-45.0

                                                                                                           -45.0 -45.0

 54.0

                                                                                                            54.0  54.0

-54.0

                                                                                                           -54.0 -54.0

 63.0

                                                                                                            63.0  63.0

-63.0

                                                                                                           -63.0 -63.0

 72.0

                                                                                                            72.0  72.0

-72.0

                                                                                                           -72.0 -72.0

 81.0

                                                                                                            81.0  81.0

                                                                                                           -81.0 -81.0

                           20.0 340.0

20.0 340.0

                           20.0 340.0

                                                                 40.0 320.0

                                         40.0 320.0

                                                                 40.0 320.0

                                                                                                       60.0 300.0

                                                                                  60.0 300.0

                                                                                                       60.0 300.0

80.0 280.0

80.0 280.0

80.0 280.0

100.0 260.0

100.0 260.0

100.0 260.0

120.0 240.0

120.0 240.0

120.0 240.0

140.0 220.0

140.0 220.0

140.0 220.0

160.0 200.0

160.0 200.0

160.0 200.0

 01.7

1.73.53.55.25.27

0

  9.0

                                                                                                             9.0   9.0

 -9.0

                                                                                                            -9.0  -9.0

 18.0

                                                                                                            18.0  18.0

-18.0

                                                                                                           -18.0 -18.0

 27.0

                                                                                                            27.0  27.0

-27.0

                                                                                                           -27.0 -27.0

 36.0

                                                                                                            36.0  36.0

-36.0

                                                                                                           -36.0 -36.0

 45.0

                                                                                                            45.0  45.0

-45.0

                                                                                                           -45.0 -45.0

 54.0

                                                                                                            54.0  54.0

-54.0

                                                                                                           -54.0 -54.0

 63.0

                                                                                                            63.0  63.0

-63.0

                                                                                                           -63.0 -63.0

 72.0

                                                                                                            72.0  72.0

-72.0

                                                                                                           -72.0 -72.0

 81.0

                                                                                                            81.0  81.0

                                                                                                           -81.0 -81.0

                           20.0 340.0

20.0 340.0

                           20.0 340.0

                                                                 40.0 320.0

                                         40.0 320.0

                                                                 40.0 320.0

                                                                                                       60.0 300.0

                                                                                  60.0 300.0

                                                                                                       60.0 300.0

80.0 280.0

80.0 280.0

80.0 280.0

100.0 260.0

100.0 260.0

100.0 260.0

120.0 240.0

120.0 240.0

120.0 240.0

140.0 220.0

140.0 220.0

140.0 220.0

160.0 200.0

160.0 200.0

160.0 200.0

  00.74

0.74

 1.51.52.22.23

0

  9.0

                                                                                                             9.0   9.0

 -9.0

                                                                                                            -9.0  -9.0

 18.0

                                                                                                            18.0  18.0

-18.0

                                                                                                           -18.0 -18.0

 27.0

                                                                                                            27.0  27.0

-27.0

                                                                                                           -27.0 -27.0

 36.0

                                                                                                            36.0  36.0

-36.0

                                                                                                           -36.0 -36.0

 45.0

                                                                                                            45.0  45.0

-45.0

                                                                                                           -45.0 -45.0

 54.0

                                                                                                            54.0  54.0

-54.0

                                                                                                           -54.0 -54.0

 63.0

                                                                                                            63.0  63.0

-63.0

                                                                                                           -63.0 -63.0

 72.0

                                                                                                            72.0  72.0

-72.0

                                                                                                           -72.0 -72.0

 81.0
                                                                                                            81.0  81.0

                                                                                                           -81.0 -81.0

                           20.0 340.0

20.0 340.0

                           20.0 340.0

                                                                 40.0 320.0

                                         40.0 320.0

                                                                 40.0 320.0

                                                                                                       60.0 300.0

                                                                                  60.0 300.0

                                                                                                       60.0 300.0

80.0 280.0

80.0 280.0

80.0 280.0

100.0 260.0

100.0 260.0

100.0 260.0

120.0 240.0

120.0 240.0

120.0 240.0

140.0 220.0

140.0 220.0

140.0 220.0

160.0 200.0

160.0 200.0

160.0 200.0