                                        0
                                               12
                                                       25
                                                               38
                                                                        50 X

                                                                             12

                                                                              25

                                                                                38

                                                                                 50

                                                                               Y

                                    -0.55

                                   2.5

                                   5.5

                                  8.5

                                 12

                                   Z
mtx1